Vitamin C Pure

Composition

Each 1 g contains:

Vitamin C (Ascorbic   Acid)            1000 mg

Indications

Vitamin C pure is used for:

–        Facilitate the absorption of Iron from the gut.

–        Improve growth and feed conversion ratio, egg production and quality .

–        Improve the immune response to increase resistance to infection.

–        Improvement of the reproductive performance in both males and females .

–        Maintenance of normal function of the skeletal tissue .

–        Enhance food and water intake during stress condition .

Dosage and administration

Poultry: 1g / 8 Liter of drinking water .

Or in feed: 1 Kg /4 ton feed.

Calves, Foals and Sheep: 200-300 mg/ 5 Liter of drinking water.

Cattle, Horses and Camels: 2-3 g/50 liter of drinking water.

Contraindications

–

Withdrawal time

–

Storage

Store in a dry and dark place below 30˚C.

The post Vitamin C Pure first appeared on Mobedco.